-- Widen bulk_operations.status
--
-- The code writes 'completed_with_errors' (21 chars) when a bulk operation
-- finishes with per-ticket failures, but the column was varchar(20), so the
-- write failed with "Data too long for column 'status'". This was unreachable
-- while bulk status changes forced every transition through; now that they
-- honour the Workflow Designer, partial failures are a normal outcome.
--
-- Safe to re-run.

ALTER TABLE `bulk_operations`
    MODIFY COLUMN `status` varchar(32) DEFAULT 'pending';
